import React from "react";
import { Flex } from "@mantine/core";
import MarketplacesHeader from "@/app/clients/drawers/ClientMarketplacesDrawer/components/MarketplacesHeader";
import MarketplacesTable from "@/app/clients/drawers/ClientMarketplacesDrawer/components/MarketplacesTable";

const DrawerBody = () => {
    return (
        <Flex
            gap={"xs"}
            h={"100%"}
            direction={"column"}>
            <MarketplacesHeader />
            <MarketplacesTable />
        </Flex>
    );
};

export default DrawerBody;
